CREATE OR REPLACE VIEW SD_HOSPITAL.VW_BM_BMBM00_YGBM00
 (
 YGBH00, ZWXM00, XB0000, XKH000, DLMM00, PYSM00, WBSM00, YGXZ00, CFJB00, 
GZDJ00, MZDJ00, DPDJ00, SJDJ00, BRID00, CZBZ00, BMBH00, BH0000, FLAG00, 
BMMC00, BMXZ00, FYBZ00, SYCW00, YJXX00, CKXX00, JZXX00, CZBZ00L

 )
 AS 
SELECT 	A.YGBH00,A.ZWXM00,A.XB0000,A.XKH000,A.DLMM00,A.PYSM00,A.WBSM00,A.YGXZ00,A.CFJB00,A.GZDJ00,
	A.MZDJ00,A.DPDJ00,A.SJDJ00,A.BRID00,A.CZBZ00,A.BMBH00,B.BH0000,B.FLAG00,B.BMMC00,
	B.BMXZ00,B.FYBZ00,B.SYCW00,B.YJXX00,B.CKXX00,B.JZXX00,B.CZBZ00
FROM BM_YGBM00 A,BM_BMBM00 B
WHERE A.BMBH00=B.BMBH00(+) and a.czbz00<>2
/
