--## 2023.08.02 add by chenrh for his13 门诊预交金作废管理
insert into PT_JHGNHB (GNID00, JHGNID, JHGNMC, SFYX00, SSXTDM, GNLX00, SQSXS0, BT0000, GNBM00, WJMC00, CDJB00, QDBZ00, TBSYH0, SFCDGN, FLAG, QQYM00)
values (SQ_PT_JHGNHB_GNID00.nextval, 'HIS13_MZSF_YJJZFGL', '门诊预交金作废管理', '1', '15', '3', '1', '门诊预交金作废管理', '00002-00009', null, null, '0', -1, '1', '0', '');